\begin{figure}[hbt] 
 \centerline{ \includegraphics[width=150mm, height=100mm]{../report_figures/boundarycomparison.png}}
\caption{Point locations used for MOST input for Onslow region.}  
\label{fig:boundarypoints}
\end{figure}
\input{latexoutput_MOST_inputSU-AUclip} 
 \clearpage 
 
