
Further modelling effort is required in the next financial year to 
investigate the solution sensitivity to cell resolution, 
bathymetry and tsunami source uncertainties. 
Further investigation of the point at which
ANUGA can use the deep water model output is also required as well
as incorporating appropriate friction coefficients.s
