\begin{figure}[hbt] 
\centerline{ \includegraphics[width=100mm, height=75mm]{../report_figures/mid_tide_20060704_063234.jpg}}  
\caption{Maximum inundation map for the MSL scenario for Onslow region.}  
\label{fig:MSL_max_inundation}
\end{figure}