This report is being provided to the Critical Infrastructure
and Protection Modelling and Analysis (CIPMA) Project by the 
Risk Assessment Methods Project (RAMP). The purpose of this
study is to determine the potential tsunami inundation extent and 
particle speed as the tsunami
impacts the major gas facilities and infrastructure in Dampier.

This report describes the modelling methodology (Section \ref{sec:methodology}),
data inputs (Section \ref{sec:data})
and results (Section \ref{sec:results})
for a specific tsunami-genic event as it impacts the Dampier gas facilities and infrastructure.
In particular, maximum inundation as well as depth and velocity time series are shown 
for the event occurring at highest astronomical tide. 
Impact assessments will be conducted by CIPMA and are not discussed here.

