This report has described the tsunami inundation occurring at the gas
facility at Dampier from a tsunami
generated by a Mw 9 earthquake on the Sunda Arc subduction zone 
occurring at Highest Astronomical Tide. 
Velocity data has also been provided at the locations of interest surrounding the gas pipeline.
The results described must be tempered with the modelling assumptions 
and the accuracy and coverage of the underlying elevation data.

